LIBRARY

EXPORTS

HGSane_CreateManager
HGSane_DestroyManager
HGSane_GetSourceCount
HGSane_GetSourceNameWithIndex
HGSane_OpenSource
HGSane_OpenSelectedSource
HGSane_CloseSource
HGSane_GetSourceName
HGSane_GetDeviceCount
HGSane_GetDeviceNameWithIndex
HGSane_OpenDevice
HGSane_OpenSelectedDevice
HGSane_CloseDevice
HGSane_GetDeviceName
HGSane_ShowDeviceSettingDlg
HGSane_StartDevice
HGSane_StopDevice
HGSane_StartDeviceWithUI
